0.5 1 1.5 2

x 10^6 0

0.5

1

1.5

2

2.5 x 10^4

n k embryo

1.7 1.8 x 10_4

1.22 1.24 1.26 1.28 x 10_4

517249 1920 1940 1960 1980 2000 2020