1 2 3 4

x 10^6 0

0.5

1

1.5

2

2.5 x 10^4

n k liver

1.88 1.9 1.92 1.94 1.96 1.98 x 10_4

1.39 1.4 1.41

x 10_4

1.07238e+06 3800

3850

3900